ESP LTD GH-200 Gary Holt Signature Series Electric Guitar – Black

The LTD GH-200 represents the most affordable model in the Gary Holt Signature Series, but it packs a mean punch It includes bolt-on constuction, with a comfortable basswood body and a thin U-shaped maple neck, with rosewood fingerboard that gives you Gary’s split rectangle inlay design and 22 extra-jumbo frets.

The GH-200 also offers an ESP Designed LH-301 pickup set with red covers, a Floyd Rose Special bridge for your most outrageous leads, and red binding on the body and headstock to complete its menacing vibe Available in Black finish.

Specifications Construction: Bolt-On Scale: 24.75″ Body: Basswood Neck: Maple Fingerboard: Rosewood Fingerboard Radius: 350mm Finish: Black Nut Width: 42mm Nut Type: Locking Neck Contour: Thin U Frets/Type: 22 XJ Hardware Color: Black Strap Button: Standard Tuners: LTD Bridge: Floyd Rose Special Neck PU: ESP Designed LH-301N Red Bridge PU: ESP Designed LH-301B Red Electronics: Passive Electronics Layout: Vol/Vol/Toggle Switch Case: CECFF Case Included: N This product includes Beginner’s Guide to Learning Guitar E-book Made in China.

Body Finish:Black

Body Material:Basswood

Body Shape:Signature

Body Type:Solid Body

Bridge Pickup:ESP Designed LH-301B Red

Bridge/ Tailpiece:Floyd Rose Special

Case/Gig Bag:Sold separately

Controls:2 x Volume

Fingerboard Inlay:Split rectangle

Fingerboard Material:Rosewood

Left-/Right- handed:–

Middle Pickup:–

Neck Joint:Bolt-On

Neck Material:Maple

Neck Pickup:ESP Designed LH-301N Red

Neck Shape:Thin U

Number of Frets:22

Number of Strings:–

Nut Material:–

Nut Width (mm):42

Radius:13.78

Scale Length in (Inches):24.75

Strings:–

Switching:Toggle Switch

Tuners:LTD